host "dir /A-D /O:N \ACCDMD\APLICACIONES\AASC\CADENAS_CONEXION\*&1*"

host "dir /A-D /O:N \ACCDMD\APLICACIONES\AASC\CADENAS_CONEXION\dga\*&1*"
